�

�

�

�

Constraints on neutral heavy lepton

m_U = 220 GeV, m_D = 200 GeV and M_E = 100 GeV.

Four-parameter fit (m_t, m_H, α̂_s, ᾱ) is done to OSAKA-2000 data, using LEP-200 limit

m_H > 113.3 GeV.

A.Rozanov, Osaka 29 July 2000