�

�

�

�

Extra generation exclusion in SUSY versus m~_b

N_g degenerate extra generations and the mass of sbottom m~_b in SUSY models

and for the choice m_D = m_U = m_E = m_N = 130 GeV, m_h = 120 GeV,

m_{g̃} = 200 GeV and absence of t̃_L − t̃_R mixing.

A.Rozanov, Osaka 29 July 2000