�

�

�

�

50 GeV neutrino at LEP-200

e^+e^− → γ + NN̄

dσ/dM_{inv} (in pb) for Standard Model and for the different values of m_N . Cuts

applied: | cos ϑ_γ| < 0.95 and p^γ_T > 0.0375 √ s. The photon detection efficiency

74%.

A.Rozanov, Osaka 29 July 2000