�

�

�

�

LEPTOP fit to electroweak observables

Observable Exp. data LEPTOP fit Pull

Γ_Z [GeV] 2.4952(23) 2.4964(16) -0.5 σ_h [nb] 41.541(37) 41.479(15) 1.7 R_l 20.767(25) 20.739(18) 1.1 A^l_{F B} 0.0171(10) 0.0164(3) 0.7 A_τ 0.1439(42) 0.1480(13) -1.0 A_e 0.1498(48) 0.1480(13) 0.4 R_b 0.2165(7) 0.2157(1) 1.2 R_c 0.1709(34) 0.1723(1) -0.4 A^b_{F B} 0.0990(20) 0.1038(9) -2.4 A^c_{F B} 0.0689(35) 0.0742(7) -1.5 s^2_l (Q_{F B}) 0.2321(10) 0.2314(2) 0.7 s^2_l (A_{LR}) 0.2310(3) 0.2314(2) -1.5 A_b 0.9110(250) 0.9349(1) -1.0 A_c 0.6300(260) 0.6683(6) -1.5 m_W [GeV] 80.434(37) 80.397(23) 1.0 s^2_W (νN ) 0.2255(21) 0.2231(2) 1.1 m_t [GeV] 174.3(5.1) 174.0(4.2) 0.1 m_H [GeV] 55^{+45}_{−26} α̂_s 0.1183(27) χ^2/n_{d.o.f.} 21.4/14

A.Rozanov, Osaka 29 July 2000