�

�

�

�

Fit fixing m_H = 120 GeV

m~_b (GeV) α̂_s χ^2/n_{d.o.f.} 100 0.110 ± 0.003 30.2/15 150 0.115 ± 0.003 21.9/15 200 0.116 ± 0.003 18.6/15 300 0.118 ± 0.003 16.4/15 400 0.119 ± 0.003 15.8/15

1000 0.119 ± 0.003 15.5/15

Fit of the precision data with SUSY corrections taken into account in the case of the absence oft̃_Lt̃_R mixing, sin θ_{LR} = 0 and with a value of the lightest Higgs-boson mass m_h = 120 GeV that is about the maximum allowed value in the simplest SUSY models.

A.Rozanov GDR SUSY 5 May 1999