�

�

�

�

Electroweak observables

Observable Experimental data Fit Standard Model Pull

Γ_Z [GeV] 2.4939(24) 2.4960(18) -0.9 σ_h [nb] 41.491(58) 41.472(16) 0.3 R_l 20.765(26) 20.746(20) 0.7 A^l_{F B} 0.0168(10) 0.0161(4) 0.7 A_τ 0.1431(45) 0.1467(16) -0.8 A_e 0.1479(51) 0.1467(16) 0.2 R_b 0.2166(7) 0.2158(2) 1.0 R_c 0.1735(44) 0.1723(1) 0.3 A^b_{F B} 0.0990(21) 0.1028(12) -1.8 A^c_{F B} 0.0709(44) 0.0734(9) -0.6 s^2_l (Q_{F B}) 0.2321(10) 0.2316(2) 0.5 s^2_l (A_{LR}) 0.2311(3) 0.2316(2) -1.6 A_b 0.8670(350) 0.9348(2) -1.9 A_c 0.6470(400) 0.6677(7) -0.5 m_W [GeV] (pp̄+ LEP-II) 80.3902(64) 80.3659(34) 0.4 s^2_W (νN ) 0.2254(21) 0.2233(7) 1.0 m_t [GeV] 173.8(5.0) 170.8(4.9) 0.6 m_H [GeV] 70.8^{+82}_{−43} α̂_s 0.1194(29) χ^2/n_{d.o.f.} = 15.0/14

A.Rozanov GDR SUSY 5 May 1999